-- locidispid must be bigint

ALTER TABLE users DROP COLUMN locidispid;
ALTER TABLE users ADD COLUMN locidispid BIGINT;
ALTER TABLE users ALTER COLUMN locidispid SET DEFAULT 0;
UPDATE users SET locidispid = 0;
ALTER TABLE users ALTER COLUMN locidispid SET NOT NULL;
